)c (GeV/

|z/|p

0.1 0.2 0.3 0.4 1 2 3 4 5 signal (arb. unit) x/dE

TPC d

0 100 200 300 400 500 600 700 800 900 1000

ALICE

0-80% Pb-Pb = 2.76 TeV s_{NN}

e- π-

K - p d t He^3

He^4